XSEG    segment public 'XSEG'
                public _SeqRam_ele
;
;********************************************************************************
;*  this segment located at 90000h -> 9ffffh                                    *
;*  function 1: reserve xilinx data
;********************************************************************************
;July.11.1997 Eric marked
xData   db      4000h   dup (?)     ;temp buffer for configure xlinx 4005
_canSource1    db  80h   dup (?)    ;temp buffer for can program (canSavePc)
_canSource2    db  80h   dup (?)    ;temp buffer for can program (setBaseSt)
;July.11.1997 Eric marked
_SeqRam_ele    db  4000h   dup (?)  ;temp buffer for WriteSeqRam testing
XSEG    ends

