NMCS2H      segment public 'NMCS2H'
;
;********************************************************************************
;*      -------- epm port definition --------                                   *
;*              epmrdy : d0090h ---->  epm ready output port d0090h             *
;*              epmout1: d0091h ---->  epm control output port d0091h           *
;*              epmin1 : d0092h ---->  epm control input port d0092h            *
;*              epmout2: d0093h ---->  epm control output port d0093h           *
;********************************************************************************
;--------------------------------------------------------------
; epm cp82550 & cp82551 control code
;--------------------------------------------------------------
        org     0f000h
pmAdr   db      1  dup (?)     ;temp buffer for configure xlinx
        org     0090h
epmRdy  db      1  dup (?)     ;epm ready output port d0090h
epmOut1 db      1  dup (?)     ;epm control output port d0091h
epmIn1  db      1  dup (?)     ;epm control input port d0092h
epmOut2 db      1  dup (?)     ;epm control output port d0093h
        ;
NMCS2H      ends
