; gosvr.def : Declares the module parameters for the application.

LIBRARY      GOSVR
DESCRIPTION  'GOSVR classes'
EXETYPE      WINDOWS

CODE         LOADONCALL MOVEABLE DISCARDABLE
DATA         PRELOAD MOVEABLE SINGLE

SEGMENTS          
    _TEXT       PRELOAD MOVEABLE DISCARDABLE
    WEP_TEXT    PRELOAD MOVEABLE DISCARDABLE

HEAPSIZE     1024   ; initial heap size
; Stack size is passed as argument to linker's /STACK option



EXPORTS

	; required WEP entry point (uses library WEP)
    	 ;WEP 					  @1 RESIDENTNAME PRIVATE
         InitGoSvrDLL 			  @2 NONAME
         HaltCmd                  @12 NONAME
		 EmuServerHalt            @13 NONAME
		 JumpCmd                  @14 NONAME
 		 EmuServerJump            @15 NONAME
		 EmuServerGo              @16 NONAME
		 GoCmd                    @17 NONAME
		 RestartCmd				  @18 NONAME
		 WaitCmd				  @19 NONAME
    
IMPORTS
	ep251.SymShowLine	
	ep251.SrcShowLine	
    ep251.ValidTraceBuffer
    ep251.TraceWnd						
    ep251.RepaintWindows   
    ep251.GetCpuStatus2                 
    ep251.GetCpuStatusBak               
    ep251.GetTraceOn                 
    ep251.SetCanTimer                  
    ep251.SetWaiting                                                
    ep251.SetCpuStatus2                 
    ep251.SetCpuStatusBak              
    ep251.SetTraceOn 
    ep251.GetCpuStatus					
    ep251.UpdateStatusBar   			
    ep251.UpdateStatusBarAll                             
    ep251.GetGoArg
    ep251.SetGoArg
    ep251.GetElapseTimeStr
    ep251.DoReset                           
    ep251.RepaintCPU  					
    ep251.RepaintMemory               
    ep251.OnEmulation               
    ep251.RepaintStack                
    ep251.RepaintVariable           
    ep251.RepaintPeri				
	ep251.UpdateStatusBarHalt