LIBRARY   LOAD251
EXETYPE   WINDOWS
CODE      PRELOAD MOVEABLE DISCARDABLE
DATA      PRELOAD MOVEABLE SINGLE
HEAPSIZE  1024
EXPORTS          
          WEP PRIVATE
; To implement your own Windows Exit Procedure add the following
; function to your application (referring to it in the .def file is
; not required.)  The extern "C" is only required if module is C++.
; extern "C" int FAR PASCAL _WEP(int)
; {
;       /* Your WEP functionality goes here */
;  return 1;
; }
 
   ; Explicitly exported initialization routine

   InitDLLLoad        @59 NONAME
   StarterLoader      @60 NONAME
   LoadCmd            @61 NONAME
   LdrGetFileLength   @62 NONAME
   LdrGetFileCurPos   @63 NONAME
   LdrGetStartAddress @64 NONAME
   LdrGetLoadBytes    @65 NONAME
   LdrIsSymbolLoaded  @66 NONAME
   LdrIsIEEE          @68 NONAME
   LdrSrcGetLoadPath  @73 NONAME
   LdrSrcGetLoadFile  @74 NONAME
   DelLdrDLL          @76 NONAME
   LdrGetCpuMode      @77 NONAME
   GetLdrCpuMode      @78 NONAME
   LdrIsOmf251        @80 NONAME
   LdrIsOmf51         @81 NONAME
   LdrIsUbrof51       @82 NONAME
   LdrIsIEEE51        @83 NONAME
    
IMPORTS
   ep251.LDRSHLRESHOWLINE
   ep251.LDRSHOWLINE
   ep251.REPAINTWINDOWS
   ep251.GETCPUMODE
                  


