LIBRARY   REGMAP
DESCRIPTION  'REGMAP.DLL of EP196, Microtek International Inc.'
EXETYPE   WINDOWS
CODE      PRELOAD MOVEABLE DISCARDABLE
DATA      PRELOAD MOVEABLE SINGLE
HEAPSIZE  1024
EXPORTS
          WEP PRIVATE
; To implement your own Windows Exit Procedure add the following
; function to your application (referring to it in the .def file is
; not required.)  The extern "C" is only required if module is C++.
; extern "C" int FAR PASCAL _WEP(int)
; {
;       /* Your WEP functionality goes here */
;  return 1;
; }

 InitDllVar              @60   NONAME
 ByteRegNameFromAddr     @61   NONAME
 ByteRegAddrFromName     @62   NONAME
 InitDLL_RegMap          @64   NONAME
 DelRegMem               @65   NONAME
 BitRegNameFromAddr      @66   NONAME
 BitRegAddrFromName      @67   NONAME
 ByteRegInfoFromID       @68   NONAME
 
 
