; STEPDLL.def : Declares the module parameters for the application.

LIBRARY      STEP251
DESCRIPTION  'Step classes'
EXETYPE      WINDOWS

CODE         LOADONCALL MOVEABLE DISCARDABLE
DATA         PRELOAD MOVEABLE SINGLE

SEGMENTS
    _TEXT       PRELOAD MOVEABLE DISCARDABLE
    WEP_TEXT    PRELOAD MOVEABLE DISCARDABLE

HEAPSIZE     1024   ; initial heap size
; Stack size is passed as argument to linker's /STACK option


EXPORTS

	; required WEP entry point (uses library WEP)
    WEP @1 RESIDENTNAME PRIVATE

	; Explicitly exported initialization routine
    InitDLL_StepServer @2 NONAME

	; other explicit exports can go here
	StepCmd			@100 NONAME
	StepServer		@101 NONAME

	; Explicitly exported classes

