; ****************************************************************************
; **
; **  Name:  enlib.def
; **
; **  Description:
; **     Contains the module definition information of the ENLIB.DLL
; **
; **  Status:  PRELIMINARY
; **
; **  $Log:   S:/tbird/arcppc/enlib/enlib.dev  $
; ** 
; **    Rev 1.0   17 Jan 1997 09:13:10   kevin
; ** Initial revision.
; ** 
; **    Rev 1.0   03 Jun 1996 11:21:34   gene
; ** Initial revision.
; ** 
; **    Rev 1.0   07 Sep 1995 10:18:28   gene
; ** Initial revision.
; ** 
; **    Rev 1.7   28 Jun 1993 10:59:20   ron
; ** changed MessageBox to ErrMessageBox and added corresponding Help button
; ** and help entry.
; ** 
; **    Rev 1.6   08 Aug 1992 09:43:42   tom
; ** new server registration changes
; ** 
; **    Rev 1.5   15 May 1992 06:14:16   mindy
; ** misspelled errtext as errortext
; ** 
; **    Rev 1.4   14 May 1992 11:57:30   mindy
; ** removed get error text routine and added import ErrInitDLL
; ** 
; **    Rev 1.3   13 May 1992 10:38:40   mindy
; ** added get error text routine
; ** 
; **    Rev 1.2   07 May 1992 11:32:32   courtney
; ** General cleanup (added LibMain to export list, removed STACKSIZE).
; ** 
; **    Rev 1.1   19 Mar 1992 12:03:40   doug
; ** there is now a CLI interface to the DLL with one command
; ** 
; **    Rev 1.0   06 Nov 1991 11:17:04   doug
; ** Initial revision.
; ** 
; **  $Header:   S:/tbird/arcppc/enlib/enlib.dev   1.0   17 Jan 1997 09:13:10   kevin  $
; **
; **
; **  Copyright (C) 1991 Microtek International.  All rights reserved.
; **
; **************************************************************************/

LIBRARY      ENLIB

DESCRIPTION  'TBird Event Notification Dynamic Link Library'
EXETYPE      WINDOWS
STUB         'WINSTUB.EXE'
CODE         PRELOAD MOVEABLE DISCARDABLE
DATA         PRELOAD MOVEABLE SINGLE
HEAPSIZE     1024

EXPORTS      WEP                     @1
             EnlRegisterWin          @2
             EnlRegister             @3
             EnlEventNotify          @4
             EnlUnRegister           @5
             InitCServer             @6
             EnlCliNotify            @7
             LibMain                 @8

IMPORTS      errtext.ErrInitDLL
             errtext.ErrMessageBox
             MALLOC.TMalloc

; /******************************** E O F ***********************************/
