; ****************************************************************************
; **
; **  Name:  wspar.def
; **
; **  Description:
; **     Windows Parallel Communication (for PCE) Library Module Definition file.
; **
; **  Status:  PRELIMINARY
; **
; **  $Log:   S:/tbird/arcppc/sds/wspar.dev  $
; ** 
; **    Rev 1.0   17 Jan 1997 09:24:06   kevin
; ** Initial revision.
; ** 
; **    Rev 1.0   03 Jun 1996 11:38:00   gene
; ** Initial revision.
; ** 
; **    Rev 1.0   07 Sep 1995 11:12:24   gene
; ** Initial revision.
; ** 
; **  $Header:   S:/tbird/arcppc/sds/wspar.dev   1.0   17 Jan 1997 09:24:06   kevin  $
; **
; **
; **  Copyright (C) 1991 Microtek International.  All rights reserved.
; **
; **************************************************************************/
LIBRARY      WSCOM

DESCRIPTION  'MS-PCE Communications'
EXETYPE      WINDOWS
STUB         'WINSTUB.EXE'
CODE         PRELOAD MOVEABLE DISCARDABLE
DATA         PRELOAD MOVEABLE SINGLE
HEAPSIZE     1024

EXPORTS      WEP                     @1
             WSComInit               @2
             WSComConfig             @3
             WSComRead               @4
             WSComWrite              @5
             WSComRecvTimer          @6
             WSComClose              @7
             WSComFlush              @8
             WSComAckRequired        @9
             WSComUploadPacketSize   @10

IMPORTS
             errtext.ErrDisplayError
             errtext.ErrInitDLL
             errtext.ErrDisplayString
